Appendix B

Photometry

This appendix contains the tables of photometry, taken from Francis et al. (2000), with the errors changed according to the method described in Section 4.5. Please note that, as is the case for the rest of the thesis, the ’PKS’ designation that usually appears at the beginning of each source name has been omitted for brevity.

The first table, Table B.1, contains the photometry for all sources that were used in the modelling described in Chapter 5. The errors given are 1σ errors, while the upper limits (that is, upper limits to the flux, or lower limits to the magnitudes) are 3σ.

The second table gives the photometry for the sources that were excluded from the modelling. The reason(s) for their exclusion are given in the table. These are:

Photometry: not enough data points to perform the modelling.

No z: the source has no measured redshift.

Galaxy: the source is at low redshift and shows evidence for the host galaxy in the SED.

z > 3: all sources with redshift above 3 were discarded due to the presence of the strong Lyα emission line.

Name B V R I J H K 0038−020 18.74 ± 0.11 18.44 ± 0.11 18.11 ± 0.11 18.01 ± 0.12 17.44 ± 0.17 16.82 ± 0.16 16.16 ± 0.16 0048−071 20.74 ± 0.20 20.32 ± 0.16 19.84 ± 0.13 19.53 ± 0.17 18.73 ± 0.22 17.93 ± 0.18 17.54 ± 0.40 0048−427 18.62 ± 0.11 18.45 ± 0.11 18.15 ± 0.10 17.75 ± 0.11 17.21 ± 0.15 16.86 ± 0.16 16.19 ± 0.16 0056−001 17.73 ± 0.10 17.55 ± 0.10 17.43 ± 0.10 — 16.49 ± 0.12 15.66 ± 0.11 14.92 ± 0.11 0131−001 23.34 ± 0.70 22.50 ± 0.50 20.78 ± 0.16 20.17 ± 0.19 17.95 ± 0.16 17.24 ± 0.15 16.78 ± 0.27 0202−172 17.46 ± 0.10 17.33 ± 0.10 17.11 ± 0.10 16.74 ± 0.10 16.27 ± 0.11 15.67 ± 0.11 15.35 ± 0.12 0213−026 21.33 ± 0.22 20.82 ± 0.16 19.99 ± 0.12 18.87 ± 0.11 17.48 ± 0.17 16.40 ± 0.13 15.17 ± 0.11 0216+011 20.33 ± 0.16 20.36 ± 0.16 19.54 ± 0.12 19.02 ± 0.13 18.14 ± 0.21 17.55 ± 0.15 17.38 ± 0.35 0220−349 21.73 ± 0.39 21.32 ± 0.28 20.83 ± 0.22 19.88 ± 0.20 18.72 ± 0.22 17.77 ± 0.16 16.82 ± 0.23 0221+067 19.85 ± 0.13 18.97 ± 0.11 18.24 ± 0.10 17.36 ± 0.10 16.29 ± 0.11 15.26 ± 0.11 14.47 ± 0.11 0226−038 17.56 ± 0.10 17.38 ± 0.10 17.17 ± 0.10 16.79 ± 0.10 16.40 ± 0.11 15.86 ± 0.11 15.13 ± 0.11 0229−398 19.74 ± 0.11 20.31 ± 0.13 19.90 ± 0.12 19.46 ± 0.13 18.86 ± 0.20 17.55 ± 0.15 17.51 ± 0.39 0232−042 15.73 ± 0.10 16.27 ± 0.10 15.93 ± 0.10 15.63 ± 0.10 15.22 ± 0.10 14.38 ± 0.10 14.28 ± 0.10 0237+040 18.33 ± 0.10 17.88 ± 0.10 17.53 ± 0.10 17.14 ± 0.10 16.49 ± 0.11 15.97 ± 0.11 15.15 ± 0.11 0240−060 19.07 ± 0.11 18.87 ± 0.11 18.61 ± 0.11 18.07 ± 0.11 17.50 ± 0.15 17.33 ± 0.18 16.35 ± 0.25 0537−441 17.93 ± 0.10 17.34 ± 0.10 16.92 ± 0.10 16.35 ± 0.10 14.76 ± 0.10 13.85 ± 0.10 13.02 ± 0.10 0829+046 16.28 ± 0.10 15.61 ± 0.10 15.11 ± 0.10 14.49 ± 0.10 13.45 ± 0.10 12.52 ± 0.10 11.80 ± 0.10 0912+029 18.75 ± 0.10 18.59 ± 0.11 18.29 ± 0.10 17.87 ± 0.11 16.97 ± 0.11 16.01 ± 0.10 15.29 ± 0.11 1016−311 18.32 ± 0.11 18.01 ± 0.10 17.82 ± 0.10 17.51 ± 0.11 16.70 ± 0.12 16.42 ± 0.13 15.59 ± 0.16 1020−103 17.10 ± 0.10 16.70 ± 0.10 16.30 ± 0.10 15.62 ± 0.10 14.85 ± 0.10 14.11 ± 0.10 13.27 ± 0.10 1032−199 18.92 ± 0.11 18.83 ± 0.11 18.60 ± 0.11 18.16 ± 0.12 17.35 ± 0.15 16.80 ± 0.14 16.04 ± 0.13 1034−293 18.83 ± 0.11 18.26 ± 0.10 17.71 ± 0.10 17.01 ± 0.10 15.76 ± 0.11 14.83 ± 0.10 13.70 ± 0.11 1036−154 20.54 ± 0.14 20.07 ± 0.13 19.43 ± 0.12 18.62 ± 0.12 17.23 ± 0.14 16.32 ± 0.11 15.63 ± 0.17 1045−188 18.55 ± 0.10 18.26 ± 0.10 17.76 ± 0.10 17.08 ± 0.10 16.30 ± 0.11 15.30 ± 0.11 14.59 ± 0.10

Table B.1: Magnitudes of PHFS sources used in modelling. Errors quoted are 1σ, while upper limits are 3σ.

Name B V R I J H K 1101−325 15.54 ± 0.10 15.54 ± 0.10 15.31 ± 0.10 14.97 ± 0.10 14.55 ± 0.10 13.93 ± 0.10 13.16 ± 0.10 1107−187 22.44 ± 0.36 21.10 ± 0.16 19.30 ± 0.11 18.74 ± 0.11 17.46 ± 0.11 17.21 ± 0.11 15.95 ± 0.12 1133−172 22.32 ± 0.36 21.54 ± 0.21 20.52 ± 0.14 19.41 ± 0.13 18.37 ± 0.23 17.69 ± 0.21 16.63 ± 0.28 1136−135 16.65 ± 0.10 16.52 ± 0.10 16.39 ± 0.10 16.06 ± 0.10 15.54 ± 0.10 14.90 ± 0.10 14.40 ± 0.10 1244−255 17.42 ± 0.10 16.99 ± 0.10 16.63 ± 0.10 16.11 ± 0.10 15.43 ± 0.10 14.66 ± 0.10 13.85 ± 0.11 1256−229 18.43 ± 0.11 17.68 ± 0.10 17.11 ± 0.10 16.39 ± 0.10 15.16 ± 0.10 14.21 ± 0.10 13.44 ± 0.10 1313−333 18.17 ± 0.11 17.63 ± 0.10 17.16 ± 0.10 16.50 ± 0.10 15.46 ± 0.10 14.36 ± 0.10 13.69 ± 0.11 1404−342 17.37 ± 0.10 16.78 ± 0.10 16.56 ± 0.10 16.35 ± 0.10 15.67 ± 0.11 15.13 ± 0.11 14.57 ± 0.12 1430−155 > 22.70 23.24 ± 0.48 22.91 ± 0.48 20.73 ± 0.18 19.07 ± 0.28 17.97 ± 0.16 17.50 ± 0.38 1430−178 19.14 ± 0.11 18.92 ± 0.11 18.55 ± 0.11 18.14 ± 0.12 17.75 ± 0.25 16.78 ± 0.19 15.69 ± 0.24 1435−218 19.20 ± 0.11 18.54 ± 0.11 18.04 ± 0.10 17.75 ± 0.11 17.64 ± 0.23 17.18 ± 0.24 16.77 ± 0.53 1437−153 19.94 ± 0.14 19.01 ± 0.11 18.47 ± 0.11 17.68 ± 0.11 16.29 ± 0.12 15.11 ± 0.11 14.24 ± 0.12 1438−347 17.80 ± 0.10 17.31 ± 0.10 16.98 ± 0.10 16.72 ± 0.10 16.36 ± 0.13 15.86 ± 0.13 15.24 ± 0.18 1450−338 22.52 ± 0.38 20.40 ± 0.13 19.39 ± 0.11 18.69 ± 0.12 16.99 ± 0.12 16.03 ± 0.11 15.23 ± 0.13 1454−060 18.36 ± 0.11 17.84 ± 0.10 17.45 ± 0.10 17.08 ± 0.10 16.56 ± 0.13 15.86 ± 0.13 15.16 ± 0.17 1504−166 20.28 ± 0.15 19.75 ± 0.14 19.35 ± 0.13 18.46 ± 0.13 16.33 ± 0.12 15.59 ± 0.11 14.01 ± 0.11 1508−055 17.37 ± 0.10 16.94 ± 0.10 16.66 ± 0.10 16.28 ± 0.10 15.56 ± 0.11 14.87 ± 0.11 14.29 ± 0.12 1510−089 17.26 ± 0.10 17.12 ± 0.10 16.72 ± 0.10 16.17 ± 0.10 15.24 ± 0.10 14.09 ± 0.10 13.27 ± 0.10 1511−100 18.18 ± 0.10 18.00 ± 0.10 17.50 ± 0.10 17.07 ± 0.10 16.46 ± 0.11 15.60 ± 0.11 14.70 ± 0.12 1511−210 22.01 ± 0.26 21.45 ± 0.21 20.65 ± 0.14 20.30 ± 0.18 18.62 ± 0.33 17.81 ± 0.26 16.79 ± 0.37 1514−241 15.18 ± 0.10 14.50 ± 0.10 13.98 ± 0.10 13.31 ± 0.10 11.95 ± 0.10 11.10 ± 0.10 10.50 ± 0.10 1519−273 18.21 ± 0.11 17.74 ± 0.10 17.18 ± 0.10 16.55 ± 0.10 15.65 ± 0.11 14.84 ± 0.11 14.08 ± 0.11 1532+016 19.12 ± 0.12 18.92 ± 0.11 18.44 ± 0.11 17.98 ± 0.12 17.40 ± 0.20 16.22 ± 0.14 15.48 ± 0.21 1542+042 18.75 ± 0.11 18.54 ± 0.11 18.21 ± 0.11 17.61 ± 0.11 17.38 ± 0.15 16.46 ± 0.13 15.82 ± 0.19 1546+027 17.43 ± 0.10 17.14 ± 0.10 16.75 ± 0.10 16.16 ± 0.10 14.97 ± 0.10 13.88 ± 0.10 13.02 ± 0.10

Table B.1: PHFS magnitudes (cont’d)

Name B V R I J H K 1548+056 19.37 ± 0.11 18.65 ± 0.11 18.13 ± 0.11 17.42 ± 0.11 16.30 ± 0.11 15.13 ± 0.11 14.30 ± 0.11 1550−269 20.24 ± 0.16 19.67 ± 0.13 19.18 ± 0.12 18.58 ± 0.13 17.63 ± 0.17 17.01 ± 0.16 16.07 ± 0.14 1555+001 20.34 ± 0.13 19.95 ± 0.12 20.00 ± 0.11 18.72 ± 0.12 17.73 ± 0.18 16.90 ± 0.15 16.24 ± 0.25 1556−245 18.89 ± 0.11 19.02 ± 0.11 18.82 ± 0.11 18.30 ± 0.12 17.59 ± 0.16 16.97 ± 0.16 16.58 ± 0.32 1602−001 17.66 ± 0.10 17.57 ± 0.10 17.10 ± 0.10 16.66 ± 0.10 16.28 ± 0.11 15.41 ± 0.11 15.19 ± 0.12 1615+029 18.01 ± 0.10 17.75 ± 0.10 17.31 ± 0.10 17.00 ± 0.10 16.66 ± 0.10 16.04 ± 0.10 15.89 ± 0.12 1616+063 19.45 ± 0.12 18.97 ± 0.11 18.76 ± 0.11 18.27 ± 0.12 17.87 ± 0.23 17.54 ± 0.25 16.52 ± 0.19 1635−035 21.58 ± 0.33 21.00 ± 0.22 20.75 ± 0.20 20.73 ± 0.34 19.11 ± 0.20 18.84 ± 0.23 17.48 ± 0.33 1654−020 23.51 ± 0.68 23.90 ± 0.87 23.05 ± 0.52 23.02 ± 0.88 > 20.00 19.92 ± 0.64 18.25 ± 0.56 1655+077 20.18 ± 0.13 19.88 ± 0.11 19.36 ± 0.11 18.42 ± 0.11 17.50 ± 0.16 16.59 ± 0.13 15.38 ± 0.15 1656+053 17.33 ± 0.10 16.86 ± 0.10 16.64 ± 0.10 16.10 ± 0.10 15.54 ± 0.11 15.04 ± 0.11 14.39 ± 0.13 1705+018 19.07 ± 0.11 18.66 ± 0.11 18.37 ± 0.11 17.86 ± 0.11 17.14 ± 0.13 16.44 ± 0.13 15.92 ± 0.13 1706+006 22.15 ± 0.30 20.59 ± 0.15 19.95 ± 0.13 18.95 ± 0.13 17.52 ± 0.18 16.38 ± 0.13 15.63 ± 0.19 1725+044 17.92 ± 0.10 17.46 ± 0.10 16.97 ± 0.10 16.37 ± 0.10 15.76 ± 0.10 14.91 ± 0.10 14.13 ± 0.10 1933−400 18.46 ± 0.11 18.03 ± 0.10 17.72 ± 0.10 17.43 ± 0.11 16.26 ± 0.11 15.79 ± 0.11 15.00 ± 0.13 1953−325 19.60 ± 0.13 18.91 ± 0.11 18.52 ± 0.11 18.00 ± 0.11 17.32 ± 0.18 16.78 ± 0.18 15.92 ± 0.27 1954−388 17.99 ± 0.10 17.55 ± 0.10 17.28 ± 0.10 16.89 ± 0.10 16.27 ± 0.12 15.28 ± 0.11 14.39 ± 0.12 1958−179 19.48 ± 0.12 18.89 ± 0.11 18.34 ± 0.11 17.54 ± 0.11 16.26 ± 0.12 14.97 ± 0.11 14.39 ± 0.12 2002−185 19.39 ± 0.11 18.82 ± 0.11 18.55 ± 0.11 18.05 ± 0.11 17.03 ± 0.13 16.87 ± 0.13 16.92 ± 0.34 2004−447 19.52 ± 0.13 18.74 ± 0.11 18.18 ± 0.11 17.35 ± 0.11 16.48 ± 0.11 15.46 ± 0.11 14.70 ± 0.11 2008−159 17.50 ± 0.10 17.07 ± 0.10 16.76 ± 0.10 16.33 ± 0.10 16.18 ± 0.12 15.58 ± 0.11 14.97 ± 0.15 2021−330 19.50 ± 0.12 19.06 ± 0.11 18.70 ± 0.11 18.31 ± 0.12 17.70 ± 0.15 16.82 ± 0.13 16.49 ± 0.20 2022−077 19.10 ± 0.11 18.55 ± 0.10 18.44 ± 0.10 18.50 ± 0.12 18.11 ± 0.31 16.61 ± 0.16 16.08 ± 0.31 2037−253 19.69 ± 0.13 19.56 ± 0.13 19.21 ± 0.12 19.24 ± 0.18 18.52 ± 0.35 18.01 ± 0.35 17.40 ± 0.66 2044−168 17.70 ± 0.10 17.55 ± 0.10 17.18 ± 0.10 17.05 ± 0.10 16.48 ± 0.13 15.99 ± 0.13 15.18 ± 0.17

Table B.1: PHFS magnitudes (cont’d)

Name B V R I J H K 2053−044 18.86 ± 0.11 18.47 ± 0.11 18.18 ± 0.11 17.99 ± 0.11 17.81 ± 0.22 16.96 ± 0.17 16.13 ± 0.26 2058−297 18.85 ± 0.11 18.68 ± 0.11 18.29 ± 0.11 18.09 ± 0.11 17.52 ± 0.17 17.00 ± 0.17 16.22 ± 0.36 2059+034 18.09 ± 0.10 17.65 ± 0.10 17.40 ± 0.10 17.20 ± 0.11 16.34 ± 0.11 16.18 ± 0.12 15.63 ± 0.17 2106−413 19.57 ± 0.13 18.85 ± 0.11 18.45 ± 0.11 17.76 ± 0.11 16.77 ± 0.12 15.74 ± 0.11 14.81 ± 0.12 2120+099 19.65 ± 0.13 19.24 ± 0.12 18.96 ± 0.12 18.36 ± 0.13 17.98 ± 0.24 17.66 ± 0.27 16.52 ± 0.35 2121+053 19.86 ± 0.13 19.22 ± 0.11 18.68 ± 0.11 17.93 ± 0.11 16.52 ± 0.11 15.49 ± 0.11 14.71 ± 0.12 2127−096 19.43 ± 0.11 18.65 ± 0.11 18.00 ± 0.11 17.39 ± 0.11 16.38 ± 0.11 15.41 ± 0.11 14.61 ± 0.12 2128−123 15.28 ± 0.10 15.13 ± 0.10 15.00 ± 0.10 14.70 ± 0.10 14.58 ± 0.10 13.89 ± 0.10 13.22 ± 0.10 2131−021 20.61 ± 0.16 20.16 ± 0.17 19.58 ± 0.14 19.11 ± 0.19 17.58 ± 0.16 16.71 ± 0.14 15.85 ± 0.19 2134+004 17.04 ± 0.10 16.80 ± 0.10 16.56 ± 0.10 16.11 ± 0.10 15.67 ± 0.11 15.18 ± 0.11 14.73 ± 0.12 2135−248 19.64 ± 0.13 19.23 ± 0.12 18.96 ± 0.12 18.41 ± 0.13 17.50 ± 0.16 16.76 ± 0.14 15.89 ± 0.20 2140−048 17.22 ± 0.10 17.18 ± 0.10 16.87 ± 0.10 16.44 ± 0.10 15.59 ± 0.10 14.76 ± 0.10 13.95 ± 0.11 2143−156 18.02 ± 0.10 17.69 ± 0.10 17.55 ± 0.10 17.09 ± 0.11 16.61 ± 0.12 15.91 ± 0.11 15.24 ± 0.14 2144+092 18.78 ± 0.11 18.36 ± 0.11 18.01 ± 0.11 17.68 ± 0.11 16.37 ± 0.11 15.69 ± 0.11 14.82 ± 0.13 2145−176 19.43 ± 0.13 19.11 ± 0.12 18.85 ± 0.11 18.23 ± 0.13 17.74 ± 0.21 17.25 ± 0.21 16.41 ± 0.33 2145+067 16.15 ± 0.10 15.80 ± 0.10 15.56 ± 0.10 15.29 ± 0.10 14.54 ± 0.10 14.17 ± 0.10 13.48 ± 0.11 2149−307 18.00 ± 0.10 17.75 ± 0.10 17.31 ± 0.10 17.20 ± 0.11 16.60 ± 0.12 16.02 ± 0.12 15.24 ± 0.16 2149+056 > 23.50 22.05 ± 0.24 20.85 ± 0.14 19.54 ± 0.13 18.26 ± 0.25 17.42 ± 0.20 17.17 ± 0.49 2149+069 18.79 ± 0.11 18.48 ± 0.11 17.99 ± 0.11 17.74 ± 0.11 16.90 ± 0.13 15.82 ± 0.11 15.76 ± 0.21 2155−152 18.42 ± 0.10 17.90 ± 0.10 17.45 ± 0.10 16.88 ± 0.10 15.67 ± 0.10 14.72 ± 0.10 13.92 ± 0.10 2200−238 18.45 ± 0.11 18.36 ± 0.11 18.10 ± 0.11 17.64 ± 0.11 17.27 ± 0.14 16.72 ± 0.14 15.82 ± 0.13 2203−188 18.85 ± 0.11 18.52 ± 0.11 18.10 ± 0.11 17.46 ± 0.11 16.69 ± 0.12 15.93 ± 0.11 15.25 ± 0.11 2208−137 16.79 ± 0.10 16.70 ± 0.10 16.42 ± 0.10 16.10 ± 0.10 15.13 ± 0.10 14.34 ± 0.10 13.40 ± 0.10 2210−257 18.74 ± 0.11 18.76 ± 0.11 18.53 ± 0.11 17.95 ± 0.11 17.34 ± 0.15 16.42 ± 0.13 15.65 ± 0.12 2212−299 17.47 ± 0.10 17.36 ± 0.10 17.12 ± 0.10 16.81 ± 0.10 15.92 ± 0.11 15.19 ± 0.11 14.59 ± 0.11

Table B.1: PHFS magnitudes (cont’d)

Name B V R I J H K 2216−038 17.03 ± 0.10 16.49 ± 0.10 16.14 ± 0.10 15.80 ± 0.10 14.81 ± 0.10 14.42 ± 0.10 13.96 ± 0.10 2223−052 18.59 ± 0.11 18.33 ± 0.11 17.89 ± 0.10 17.43 ± 0.11 16.45 ± 0.11 15.51 ± 0.11 14.69 ± 0.11 2227−088 18.31 ± 0.11 18.15 ± 0.11 17.81 ± 0.10 17.39 ± 0.11 16.47 ± 0.11 15.70 ± 0.11 15.06 ± 0.13 2227−399 17.94 ± 0.10 17.77 ± 0.10 17.19 ± 0.10 16.69 ± 0.10 15.87 ± 0.11 15.02 ± 0.10 14.11 ± 0.11 2229−172 21.26 ± 0.21 21.14 ± 0.20 21.34 ± 0.31 19.83 ± 0.19 18.88 ± 0.28 17.71 ± 0.23 16.77 ± 0.19 2233−148 19.24 ± 0.11 18.61 ± 0.11 18.06 ± 0.10 17.27 ± 0.10 16.38 ± 0.11 15.42 ± 0.11 14.57 ± 0.10 2239+096 19.00 ± 0.11 18.68 ± 0.11 18.34 ± 0.11 17.91 ± 0.11 17.42 ± 0.15 16.73 ± 0.13 16.01 ± 0.20 2240−260 17.95 ± 0.10 17.37 ± 0.10 16.95 ± 0.10 16.36 ± 0.10 15.15 ± 0.10 14.32 ± 0.10 13.52 ± 0.10 2243−123 16.65 ± 0.10 16.50 ± 0.10 16.32 ± 0.10 16.04 ± 0.10 15.51 ± 0.10 15.00 ± 0.10 14.50 ± 0.11 2245−328 19.08 ± 0.11 18.82 ± 0.11 18.51 ± 0.11 18.31 ± 0.12 17.61 ± 0.16 17.20 ± 0.16 16.08 ± 0.21 2252−090 22.03 ± 0.25 21.51 ± 0.18 20.49 ± 0.15 19.48 ± 0.14 18.98 ± 0.49 17.02 ± 0.18 16.48 ± 0.34 2312−319 18.10 ± 0.10 17.86 ± 0.10 17.50 ± 0.10 17.09 ± 0.10 16.82 ± 0.13 16.04 ± 0.12 15.63 ± 0.13 2313−438 19.89 ± 0.14 19.53 ± 0.12 19.10 ± 0.11 18.60 ± 0.13 17.97 ± 0.21 17.37 ± 0.20 16.72 ± 0.19 2314−409 18.33 ± 0.11 18.08 ± 0.10 17.75 ± 0.10 17.36 ± 0.11 16.74 ± 0.12 16.15 ± 0.12 15.59 ± 0.12 2329−415 19.40 ± 0.12 19.17 ± 0.11 18.89 ± 0.11 18.41 ± 0.13 17.58 ± 0.16 16.67 ± 0.13 15.67 ± 0.12 2345−167 17.23 ± 0.10 16.79 ± 0.10 16.44 ± 0.10 15.88 ± 0.10 14.53 ± 0.10 13.57 ± 0.10 12.76 ± 0.10 2351−154 18.97 ± 0.11 18.71 ± 0.11 18.46 ± 0.11 18.42 ± 0.13 17.88 ± 0.20 17.06 ± 0.16 16.37 ± 0.27 2354−117 18.81 ± 0.11 18.03 ± 0.10 17.80 ± 0.10 17.44 ± 0.11 16.56 ± 0.11 15.96 ± 0.11 15.06 ± 0.11

Table B.1: PHFS magnitudes (cont’d)

Name B V R I J H K Explanation 0036−216 21.20 ± 0.22 19.36 ± 0.11 18.33 ± 0.10 17.46 ± 0.10 16.20 ± 0.11 15.39 ± 0.11 14.46 ± 0.11 no z, galaxy 0048−097 16.12 ± 0.10 15.75 ± 0.10 15.39 ± 0.10 14.92 ± 0.10 13.99 ± 0.10 13.24 ± 0.10 12.51 ± 0.10 no z 0153−410 19.81 ± 0.13 18.15 ± 0.11 17.41 ± 0.10 16.69 ± 0.10 15.49 ± 0.11 14.81 ± 0.11 14.14 ± 0.11 galaxy 0238−084 12.03 ± 0.10 11.04 ± 0.10 10.44 ± 0.10 9.77 ± 0.10 8.70 ± 0.10 7.92 ± 0.10 7.68 ± 0.10 galaxy 0240−217 19.20 ± 0.13 17.93 ± 0.11 17.07 ± 0.10 16.34 ± 0.10 — 14.23 ± 0.10 13.63 ± 0.11 galaxy 0256+075 21.32 ± 0.20 20.68 ± 0.16 19.92 ± 0.12 18.92 ± 0.12 — — — photometry 0301−243 16.51 ± 0.10 16.10 ± 0.10 15.69 ± 0.10 15.22 ± 0.10 — — — photometry, no z 0316−444 16.07 ± 0.10 14.76 ± 0.10 14.12 ± 0.10 13.51 ± 0.10 — — — photometry, galaxy 0922+005 — — 17.09 ± 0.10 16.58 ± 0.10 — — — photometry 1021−006 18.38 ± 0.11 18.25 ± 0.10 18.03 ± 0.10 17.61 ± 0.11 17.12 ± 0.13 — — photometry 1038+064 17.10 ± 0.10 16.92 ± 0.10 16.63 ± 0.10 16.43 ± 0.10 — — — photometry 1042+071 20.38 ± 0.14 19.87 ± 0.14 19.12 ± 0.12 18.27 ± 0.12 — — — photometry 1048−313 20.19 ± 0.13 20.19 ± 0.16 19.70 ± 0.14 19.21 ± 0.18 — — — photometry 1055−243 19.13 ± 0.11 18.71 ± 0.11 18.40 ± 0.11 17.94 ± 0.11 — — — photometry 1055+018 18.17 ± 0.10 17.63 ± 0.10 17.15 ± 0.10 16.47 ± 0.10 — — — photometry 1110−217 24.41 ± 1.08 23.01 ± 0.43 21.57 ± 0.16 21.10 ± 0.23 19.06 ± 0.21 17.82 ± 0.14 16.74 ± 0.17 no z 1156−094 21.95 ± 0.34 21.43 ± 0.23 20.47 ± 0.14 20.22 ± 0.19 18.16 ± 0.23 17.51 ± 0.22 16.87 ± 0.22 no z 1330+022 19.02 ± 0.11 17.89 ± 0.10 17.24 ± 0.10 16.47 ± 0.10 15.23 ± 0.10 14.43 ± 0.10 13.71 ± 0.11 galaxy 1353−341 19.20 ± 0.11 17.46 ± 0.10 16.74 ± 0.10 15.94 ± 0.10 15.20 ± 0.11 14.38 ± 0.10 13.62 ± 0.11 galaxy 1411+094 18.64 ± 0.13 17.56 ± 0.11 16.77 ± 0.10 16.15 ± 0.11 15.10 ± 0.11 14.36 ± 0.11 13.78 ± 0.11 galaxy

Table B.2: Magnitudes of PHFS sources excluded from the modelling, and reasons for their exlusion. Errors are 1σ, while upper limits are 3σ.

Name B V R I J H K Explanation 1456+044 — — 18.83 ± 0.10 18.12 ± 0.10 16.17 ± 0.10 15.71 ± 0.10 14.30 ± 0.10 photometry 1509+022 19.75 ± 0.15 18.27 ± 0.11 — — 16.04 ± 0.11 15.12 ± 0.11 14.31 ± 0.12 photometry, galaxy 1518+045 16.11 ± 0.10 14.84 ± 0.10 14.20 ± 0.10 13.45 ± 0.10 12.06 ± 0.10 11.31 ± 0.10 11.02 ± 0.10 galaxy 1535+004 > 21.70 — > 22.30 > 21.50 — > 19.73 — photometry 1555−140 18.28 ± 0.10 16.93 ± 0.10 16.28 ± 0.10 15.47 ± 0.10 14.25 ± 0.10 13.43 ± 0.10 13.08 ± 0.10 galaxy 1601−222 — — > 22.90 > 22.40 — > 20.02 > 19.49 photometry 1614+051 20.38 ± 0.14 19.38 ± 0.11 19.31 ± 0.12 18.93 ± 0.13 18.04 ± 0.25 17.83 ± 0.31 17.31 ± 0.33 z > 3 1648+015 21.87 ± 0.32 21.14 ± 0.20 20.41 ± 0.14 19.50 ± 0.13 17.84 ± 0.12 16.85 ± 0.11 16.56 ± 0.16 no z 1649−062 — — > 23.20 > 23.30 > 18.88 > 17.77 > 17.03 photometry 1732+094 > 23.50 21.15 ± 0.14 19.74 ± 0.11 19.33 ± 0.11 18.40 ± 0.22 17.44 ± 0.16 16.37 ± 0.22 no z 2000−330 18.90 ± 0.11 17.48 ± 0.10 16.92 ± 0.10 16.71 ± 0.10 16.10 ± 0.11 15.64 ± 0.11 15.10 ± 0.12 z > 3 2047+098 — — > 22.99 > 22.19 — > 19.92 — photometry 2056−369 — > 23.50 23.45 ± 0.61 22.22 ± 0.45 19.55 ± 0.40 19.07 ± 0.40 18.21 ± 0.42 no z 2058−135 15.88 ± 0.10 14.76 ± 0.10 14.15 ± 0.10 13.45 ± 0.10 12.35 ± 0.10 11.58 ± 0.10 11.39 ± 0.10 galaxy 2126−158 17.97 ± 0.10 16.92 ± 0.10 16.63 ± 0.10 16.23 ± 0.10 15.45 ± 0.10 14.89 ± 0.10 14.30 ± 0.10 z > 3 2206−237 17.41 ± 0.11 16.25 ± 0.10 15.70 ± 0.10 15.04 ± 0.10 13.94 ± 0.10 13.23 ± 0.10 12.87 ± 0.11 galaxy 2215+020 21.84 ± 0.32 20.42 ± 0.13 20.14 ± 0.15 20.00 ± 0.22 19.20 ± 0.50 18.21 ± 0.30 19.34 ± 1.78 z > 3 2245+029 21.71 ± 0.23 21.00 ± 0.19 20.26 ± 0.13 19.48 ± 0.14 17.45 ± 0.16 16.63 ± 0.15 15.49 ± 0.17 no z 2337−334 22.93 ± 0.60 21.89 ± 0.28 21.40 ± 0.22 20.51 ± 0.16 19.88 ± 0.54 18.42 ± 0.33 16.39 ± 0.22 no z 2344−192 23.52 ± 0.68 — 21.68 ± 0.26 20.96 ± 0.28 18.71 ± 0.16 17.64 ± 0.13 17.25 ± 0.22 no z

Table B.2: Magnitudes of excluded PHFS sources. (cont’d)