Empty page

Table 1: List of sources selected for IDV Survey and the structural information obtained from the closure phases and selfcalibration.

Parkes Galactic coord.

Source l_{II} b_{II} id z Source name (deg) (deg) structure 0003−066 93.21 −66.51 G 0.347 P P C E 0013−005 103.70 −61.75 Q 1.575 C P C C 0023−263 42.26 −84.10 G 0.322 Cd Cd P E 0044−846 303.14 −32.80 Q P C E E 0048−427 303.70 −74.70 Q 1.749 P P C E

0056−572 301.09 −60.17 Q C C C Ec 0104−408 290.98 −76.25 Q 0.584 P P C E 0122−003 140.66 −61.75 Q* 1.070 Pc C E E 0131−522 288.25 −63.98 Q C C C Ec 0138−097 158.45 −68.86 BL Lac* 0.440 E E E E

0142−278 218.02 −78.26 Q 1.153 C C C E 0146+056 147.79 −54.24 Q 2.345 P P C Ec 0150−334 241.26 −75.56 Q 0.610 C P C Cc 0202−172 185.61 −70.31 Q 1.740 P P C Cc 0208−512 276.27 −61.91 HPQ 1.003 C C C C

0214−522 276.14 −60.55 EF E E C Cc 0215+015 162.07 −54.46 BL Lac* 1.715 P P Cc E 0220−349 239.75 −69.20 Q P P Ec Ec 0252−549 272.49 −54.61 Q 0.537 C C Cc E 0302−623 280.23 −48.81 Q C C Cc Cc

0308−611 278.14 −49.06 Q Cj C C C 0334−546 266.87 −49.62 Q C C C Ec 0336−019 187.76 −42.63 HPQ* 0.852 P Cc C Ec 0346−279 224.38 −51.02 Q 0.988 C C Cc E 0355−483 256.14 −48.60 Q 1.005 C C C E

0405−385 241.18 −47.93 Q 1.285 P P C C 0420−014 195.12 −33.26 HPQ* 0.915 P P C Ec 0422+004 193.64 −31.87 BL Lac* 0.310 C C Ec E 0426−380 240.63 −43.79 BL Lac 1.030 C Cc Ec Ec 0434−188 216.21 −37.97 Q 2.702 C C E E

0437−454 250.76 −41.85 Q C C E E 0440−003 197.10 −28.43 Q 0.850 C C C E 0450−469 252.68 −39.57 Q C C C E 0454−463 251.91 −38.88 Q 0.850 E E E E 0454−810 293.75 −31.42 Q 0.444 P P P C

0457+024 197.00 −23.40 Q 2.384 P P P C 0502+049 195.40 −21.03 Q C C Ec E 0522−611 270.14 −34.19 Q 1.400 C C C Ec 0528−250 228.19 −28.23 Q* 2.779 C P C E 0537−286 232.77 −27.46 Q 3.104 C C E E

0537−441 250.06 −31.15 BL Lac* 0.894 P Pc Cc Cc 0607−157 222.57 −16.28 Q 0.324 P P Ec C 0642−349 244.20 −16.59 Q 2.165 C C C Ec 0646−306 240.43 −14.14 Q 0.455 P P C C 0648−165 227.63 −7.72 EF^‡ P P E E

0727−115 227.58 2.97 EF^‡ P C C C 0728−320 245.70 −6.68 Q C P E E 0733−174 233.45 1.38 EF^‡ C P P C 0736+017 216.94 11.21 HPQ* 0.191 P P C P 0808+019 220.63 18.37 BL Lac* Ed^§ P C E

0829+046 220.73 24.26 BL Lac* 0.180 P P Cc Ec 0834−201 243.51 12.16 Q 2.752 P C C E 0837+035 222.85 25.49 BL Lac C C C E 1021−006 245.05 44.76 Q* 2.547 C C Cc Ec 1034−293 270.76 24.74 BL Lac 0.312 P C E E

1036−154 261.94 36.41 Q C C E E 1048−313 274.74 24.60 EF C P C C 1057−797 297.93 −18.22 Q P P Cc C 1105−680 293.47 −7.34 Q 0.588 P C C E 1115−122 270.00 44.31 Q/IrS C C C E

continued on next page continued from previous page

Parkes Galactic coord.

Source l_{II} b_{II} id z Source name (deg) (deg) structure

1127−145 275.07 43.62 Q 1.187 Ej Pc^§ Cc Cc 1143−245 284.44 35.72 Q 1.950 E C C E 1144−379 289.13 22.95 BL Lac* 1.048 P Pc C E 1148−001 272.44 58.84 Q* 1.976 P P C Ec 1148−671 297.10 −5.20 Q P C E C

1243−072 300.38 55.37 Q 1.286 P C C C 1253−055 304.83 57.09 HPQ* 0.538 C P E E 1255−316 304.49 30.98 Q 1.924 P C C E 1256−220 305.14 40.57 Q 1.306 C C^§ C E 1334−127 319.67 48.44 BL Lac* 0.539 P C C C

1351−018 332.55 57.21 Q 3.707 C C C E 1354−152 325.28 44.58 Q 1.890 C C C Ec 1402−012 337.50 56.44 Q* 2.518 C C C E 1406−076 333.81 50.35 Q 1.494 P C E E 1435−218 333.19 34.53 Q 1.194 C C Cc E

1443−162 338.77 38.38 Q C C E E 1502+036 2.03 50.34 Q 0.411 C P C E 1504−166 343.64 35.17 HPQ* 0.876 P P C E 1519−273 339.48 24.51 BL Lac P C C C 1535+004 5.94 41.92 EF P C C E

1540−828 308.27 −22.02 EF C P C C 1549−790 311.22 −19.39 G 0.15 P Cc P E 1555−140 356.43 28.79 GPair 0.097 C C C E 1556−245 348.33 21.27 Q 2.813 C C E E 1610−771 313.45 −18.77 Q* 1.710 P P Cc Ec

1619−680 320.76 −12.96 Q 1.360 P C C Ec 1622−297 348.71 13.50 Q 0.815 P^§ P Cc C 1718−649 326.98 −15.73 G 0.014 P P Pc C 1741−038 21.56 13.21 HPQ 1.054 P C P C 1758−651 328.84 −19.57 G P P C C

1815−553 339.22 −17.68 Q P P C E 1921−293 9.32 −19.45 HPQ* 0.352 P P Pc Pc 1925−610 335.85 −28.02 Q P C C E 1937−101 29.35 −15.21 Q 3.780 C P C E 1958−179 24.06 −23.08 Q 0.650 P C C C

2016−615 335.38 −34.15 Q C C C E 2052−474 352.65 −40.24 Q 1.489 Cc Cc Ec Ec 2058−297 15.86 −39.76 Q 0.698 C P C E 2106−413 0.78 −42.77 Q 1.055 P C C C 2109−811 311.62 −32.24 EF C P C E

2121+053 57.89 −30.12 Q 1.878 P P C C 2126−158 35.95 −41.74 Q 3.268 P P C E 2128−123 40.46 −40.75 Sy1* 0.501 P C C C 2134+004 55.38 −35.60 Q* 1.932 P P P E 2142−758 315.85 −36.54 Q 1.139 C C C E

2146−783 313.24 −35.19 Q C C E E 2149−307 17.08 −50.78 Q 2.345 C C C C 2155−304 17.80 −52.03 BL Lac* 0.116 C P C E 2243−123 53.83 −56.89 Q* 0.630 P C C C 2245−328 13.96 −62.74 Q 2.268 C C E E

2312−319 15.05 −68.50 Q 0.284 C C C E 2320−035 77.46 −58.02 Q 1.411 P C C C 2326−477 336.01 −64.04 Q 1.299 C C C Cc 2329−384 354.58 −70.00 Q 1.195 C C C E 2332−017 84.07 −58.37 Q* 1.185 C P E E 2333−528 326.90 −60.94 Q P C Cc E 2345−167 65.56 −71.74 HPQ* 0.576 C P C C 2355−534 320.33 −62.15 Q* 1.006 P P E C

Table 2: The normalized scatter of PKS 1934-638 flux density measurements (m_{1934−638}), averaged over two observing runs: May 1994 and August 1994, and the theoretical rms error expected from 1 minute observation of PKS 1934-638 compared with the measured values at four ATCA frequencies.

frequency μ_{1934−638} theoretical rms measured rms (GHz) (%) in 1 min observation (mJy) 8.6 0.35 0.67 2.4 4.8 0.24 0.72 1.8 2.4 0.50 0.76 3.9 1.4 0.41 0.60 3.8

Table 3: The averaged total flux density values (S) and the variability measures: modulation indices (μ_S ) for the sample of IDV sources. N - is the number of data points included in averages. The subscripts (1) and (2) correspond to measurements for two different observing runs, (1) stands for May 1994 and (2) for August 1994. The table shows the data for four frequencies: 8.6 GHz, 4.8 GHz, 2.4 GHz and 1.4 GHz.

8.6 GHz 4.8 GHz 2.4 GHz 1.4 GHz May 94 August 94 May 94 August 94 May 94 August 94 May 94 August 94 Source N S_1 μ_{S1} N S_2 μ_{S2} N S_1 μ_{S1} N S_2 μ_{S2} N S_1 μ_{S1} N S_2 μ_{S2} N S_1 μ_{S1} N S_2 μ_{S2} name Jy Jy Jy Jy Jy Jy Jy Jy 0003−066 16 3.06 0.006 7 2.85 0.003 16 3.17 0.005 7 3.08 0.004 0013−005 9 0.83 0.009 7 0.84 0.004 9 1.01 0.006 7 1.08 0.003 13 1.11 0.008 7 1.16 0.013 13 1.06 0.009 7 1.09 0.007 0044−846 15 0.50 0.008 15 0.013 0.035 0048−427 16 1.06 0.007 8 1.07 0.004 17 0.92 0.006 8 0.99 0.005 0056−572 13 0.52 0.006 12 0.50 0.008 13 0.58 0.008 12 0.57 0.007

0104−408 17 2.60 0.011 9 3.03 0.003 17 1.55 0.013 9 1.80 0.004 13 0.91 0.044 9 0.93 0.007 0131−522 13 0.47 0.008 13 0.010 0.038 17 0.38 0.010 0142−278 9 0.72 0.010 10 0.62 0.005 9 0.76 0.011 10 0.74 0.007 9 0.71 0.010 10 0.73 0.010 0146+056 9 1.25 0.004 7 1.27 0.005 9 1.32 0.006 7 1.36 0.003 7 1.07 0.013 7 1.10 0.011 7 0.81 0.020 7 0.84 0.012 0150−334 17 0.89 0.006 10 0.82 0.004 17 1.05 0.007 10 1.01 0.003 12 1.11 0.017 9 1.10 0.008 12 1.12 0.017 9 1.13 0.012

0202−172 9 1.45 0.017 10 1.42 0.008 9 1.42 0.007 10 1.47 0.009 11 1.23 0.024 10 1.26 0.008 11 1.18 0.017 10 1.19 0.018 0214−522 21 0.34 0.008 10 0.33 0.004 21 0.51 0.004 10 0.51 0.005 14 0.71 0.009 11 0.72 0.010 14 0.86 0.008 11 0.87 0.013 0215+015 10 0.71 0.007 9 0.84 0.010 10 0.56 0.014 9 0.68 0.008 7 0.55 0.021 9 0.56 0.018 0220−349 13 0.80 0.010 14 0.81 0.005 13 0.83 0.007 14 0.85 0.005 16 0.74 0.020 10 0.73 0.005 16 0.69 0.019 10 0.65 0.017 0252−549 17 0.94 0.008

0302−623 12 1.89 0.003 12 1.86 0.006 12 2.09 0.007 12 2.08 0.004 18 2.13 0.009 13 2.10 0.008 18 2.16 0.009 13 1.93 0.005 0308−611 14 1.67 0.008 15 1.72 0.017 14 1.36 0.014 15 1.46 0.011 11 0.90 0.024 12 0.94 0.016 0334−546 12 0.39 0.004 11 0.37 0.004 12 0.52 0.005 11 0.50 0.005 14 0.49 0.007 16 0.48 0.005 14 0.38 0.016 16 0.37 0.035 0336−019 7 2.50 0.012 8 2.34 0.009 0346−279 9 1.25 0.009 11 1.08 0.007 9 1.22 0.030 11 1.01 0.015 7 1.05 0.016 11 0.90 0.022 7 0.96 0.027 10 0.81 0.030

0355−483 13 0.35 0.005 34 0.35 0.038 13 0.46 0.009 34 0.46 0.005 11 0.40 0.017 35 0.41 0.009 0405−385 11 1.45 0.043 76 1.33 0.003 11 1.38 0.056 76 1.27 0.007 14 1.13 0.056 77 1.08 0.011 14 0.92 0.052 77 0.90 0.009 0420−014 6 2.27 0.012 11 2.10 0.011 6 2.45 0.006 11 2.28 0.005 6 2.37 0.007 15 2.50 0.008 6 2.02 0.013 14 2.69 0.011 0422+004 10 0.51 0.018 10 0.024 0.068 0426−380 15 1.44 0.008 22 1.62 0.004

0434−188 8 0.98 0.010 13 0.97 0.007 8 1.07 0.013 13 1.06 0.007 0437−454 11 0.32 0.025 35 0.34 0.009 10 0.33 0.016 35 0.33 0.014 0440−003 11 0.029 0.059 11 1.68 0.011 11 0.018 0.043 10 1.48 0.015 0450−469 15 0.34 0.012 21 0.42 0.003 15 0.41 0.016 21 0.48 0.004 11 0.46 0.034 24 0.49 0.006 0454−810 16 1.87 0.014 17 2.03 0.006 16 1.72 0.019 17 1.79 0.010 13 1.28 0.010 17 1.16 0.012

0457+024 7 1.30 0.007 12 1.31 0.011 7 1.75 0.007 12 1.80 0.009 7 2.00 0.013 10 2.05 0.025 7 1.94 0.014 9 1.97 0.029 0502+049 6 0.64 0.005 9 0.72 0.027 6 0.81 0.018 9 0.77 0.011 10 0.91 0.024 8 0.85 0.021 0522−611 11 0.65 0.007 13 0.61 0.008 11 0.66 0.005 13 0.65 0.007 15 0.67 0.010 14 0.69 0.007 15 0.73 0.015 13 0.75 0.022 0528−250 8 0.63 0.020 14 0.63 0.009 8 0.86 0.014 14 0.86 0.005 0537−286 8 0.45 0.007 13 0.39 0.006 8 0.67 0.018 13 0.56 0.005

0537−441 12 6.43 0.006 35 6.29 0.004 0607−157 10 4.02 0.012 11 5.74 0.005 10 3.20 0.013 12 4.15 0.023 8 2.40 0.013 11 2.80 0.031 8 2.43 0.009 10 2.61 0.008 0642−349 16 0.79 0.008 11 0.77 0.009 16 0.94 0.007 11 0.93 0.011 11 0.82 0.019 12 0.82 0.010 11 0.73 0.026 12 0.73 0.020 0646−306 11 1.08 0.014 16 0.99 0.012 11 1.10 0.024 16 1.05 0.011 13 0.82 0.037 11 0.91 0.024 13 0.76 0.021 11 0.76 0.032 0648−165 10 1.52 0.009 12 1.64 0.007 10 1.47 0.008 12 1.52 0.009

0727−115 13 4.86 0.005 12 4.18 0.007 13 5.09 0.012 12 4.34 0.007 10 3.97 0.009 14 3.69 0.011 10 3.27 0.013 13 2.90 0.013 0728−320 13 0.23 0.026 11 0.22 0.011 13 0.31 0.034 11 0.33 0.007 0733−174 9 1.31 0.010 12 1.29 0.004 9 1.88 0.004 12 1.84 0.007 13 2.59 0.012 15 2.47 0.011 13 2.74 0.006 15 2.72 0.004 0736+017 9 1.32 0.012 13 1.03 0.019 9 1.41 0.013 13 1.22 0.012 8 1.53 0.013 10 1.65 0.022 8 1.75 0.010 10 2.02 0.010 0808+019 9 1.02 0.014 12 0.57 0.021 9 0.97 0.011 12 0.59 0.023 13 0.80 0.025 13 0.56 0.022

0829+046 11 1.18 0.007 11 1.23 0.007 11 1.12 0.000 11 1.10 0.013 8 1.00 0.004 12 0.98 0.016 8 0.97 0.016 12 0.93 0.017 0834−201 10 2.24 0.013 12 2.13 0.010 10 1.84 0.004 12 1.75 0.005 14 1.64 0.011 13 1.62 0.012 0837+035 9 0.69 0.014 11 0.68 0.007 9 0.75 0.004 11 0.74 0.012 8 0.71 0.016 10 0.72 0.011 1021−006 9 0.52 0.009 7 0.51 0.003 9 0.77 0.008 7 0.76 0.005 12 1.01 0.007 8 1.03 0.008 12 0.99 0.015 6 1.01 0.017 1034−293 11 1.80 0.057 10 2.32 0.012 11 1.17 0.092 10 1.78 0.113

1036−154 9 0.41 0.013 11 0.41 0.007 9 0.39 0.006 11 0.39 0.007 1048−313 15 0.73 0.026 10 0.72 0.019 15 0.87 0.011 10 0.86 0.025 11 0.91 0.023 9 0.94 0.010 11 0.85 0.030 9 0.93 0.015 1057−797 11 2.10 0.007 15 2.09 0.009 14 1.49 0.002 19 1.33 0.014 14 1.01 0.010 17 1.04 0.015 1105−680 12 1.04 0.008 15 1.01 0.007 12 1.20 0.003 16 1.22 0.004 11 0.92 0.010 14 1.00 0.009 1115−122 11 0.68 0.019 9 0.59 0.003 11 0.65 0.018 9 0.58 0.012 9 0.62 0.009 9 0.61 0.013

continued on next page continued from previous page

8.6 GHz 4.8 GHz 2.4 GHz 1.4 GHz May 94 August 94 May 94 August 94 May 94 August 94 May 94 August 94 Source N S_1 μ_{S1} N S_2 μ_{S2} N S_1 μ_{S1} N S_2 μ_{S2} N S_1 μ_{S1} N S_2 μ_{S2} N S_1 μ_{S1} N S_2 μ_{S2} name Jy Jy Jy Jy Jy Jy Jy Jy

1127−145 9 2.84 0.005 9 2.82 0.005 9 3.57 0.003 9 3.58 0.003 13 4.39 0.008 11 4.50 0.013 12 5.06 0.007 9 5.19 0.007 1143−245 17 1.03 0.008 10 1.03 0.006 17 1.43 0.003 10 1.40 0.004 10 1.68 0.010 11 1.66 0.013 1144−379 12 2.33 0.075 9 2.14 0.017 12 2.47 0.146 9 2.04 0.031 1148−001 9 1.16 0.006 9 1.14 0.002 9 1.61 0.002 9 1.58 0.002 11 2.14 0.005 8 2.19 0.004 11 2.63 0.004 8 2.64 0.009 1148−671 13 1.15 0.005 15 1.11 0.009 13 1.69 0.006 15 1.66 0.002 12 1.29 0.017 12 1.10 0.013

1243−072 14 1.08 0.007 6 1.06 0.006 14 0.87 0.007 6 0.86 0.001 11 0.63 0.004 7 0.66 0.003 11 0.54 0.012 7 0.55 0.018 1255−316 15 1.47 0.009 8 1.47 0.013 15 1.55 0.016 8 1.56 0.009 18 1.12 0.020 11 0.98 0.017 1256−220 16 0.60 0.012 7 0.74 0.027 16 0.52 0.014 7 0.56 0.022 11 0.56 0.009 7 0.57 0.007 11 0.64 0.040 7 0.66 0.017 1334−127 10 5.27 0.008 7 4.88 0.019 1351−018 14 0.85 0.007 6 0.84 0.009 14 0.98 0.003 6 0.96 0.014 11 0.82 0.018 6 0.83 0.014

1354−152 11 0.88 0.007 7 0.84 0.009 11 0.96 0.004 7 0.87 0.010 14 0.76 0.013 7 0.75 0.008 1402−012 14 0.23 0.013 7 0.23 0.009 14 0.34 0.007 7 0.33 0.005 11 0.43 0.017 7 0.43 0.018 11 0.50 0.027 7 0.48 0.014 1406−076 11 1.01 0.011 7 1.00 0.010 11 0.76 0.010 7 0.80 0.011 1435−218 14 0.57 0.008 8 0.56 0.010 14 0.63 0.004 8 0.58 0.007 1443−162 12 0.44 0.012 7 0.39 0.019 12 0.43 0.015 7 0.40 0.008

1502+036 13 0.60 0.020 6 0.71 0.002 13 0.57 0.014 6 0.66 0.008 1504−166 12 2.54 0.016 7 2.49 0.004 12 2.71 0.019 7 2.64 0.008 1519−273 15 1.41 0.029 7 1.77 0.018 15 1.44 0.037 7 1.72 0.023 10 1.09 0.040 8 1.28 0.009 10 0.98 0.035 8 0.91 0.009 1535+004 10 0.43 0.007 7 0.42 0.003 10 0.56 0.004 7 0.55 0.006 15 0.64 0.009 7 0.63 0.009 15 0.68 0.014 7 0.65 0.018 1540−828 15 0.58 0.007 15 0.58 0.004 15 0.67 0.008 15 0.68 0.005 16 0.74 0.005 15 0.74 0.008 16 0.89 0.013 15 0.85 0.026

1549−790 22 3.01 0.003 14 0.002 0.068 14 5.47 0.009 1555−140 9 0.41 0.015 8 0.41 0.004 9 0.59 0.007 8 0.58 0.004 9 0.65 0.006 7 0.66 0.009 1556−245 9 0.27 0.015 8 0.28 0.042 9 0.38 0.028 8 0.39 0.033 1610−771 16 3.17 0.005 13 3.27 0.004 16 3.19 0.005 13 3.25 0.006 1619−680 24 1.41 0.004 9 1.34 0.003 23 1.93 0.002 9 1.86 0.003 16 2.04 0.006 9 1.88 0.007 16 1.66 0.012 9 1.54 0.009

1622−297 11 2.25 0.020 10 2.19 0.031 11 2.32 0.011 10 2.24 0.014 10 2.12 0.021 9 2.09 0.016 1718−649 14 3.60 0.003 9 3.42 0.004 14 4.42 0.002 9 4.33 0.004 17 4.14 0.000 9 4.10 0.006 18 3.47 0.004 9 3.41 0.005 1741−038 11 3.23 0.009 6 3.81 0.006 11 2.53 0.010 6 2.74 0.012 13 1.89 0.014 6 1.94 0.009 13 1.56 0.010 6 1.47 0.005 1758−651 20 0.70 0.007 8 0.67 0.004 20 0.66 0.019 8 0.63 0.005 14 0.61 0.008 9 0.58 0.011 14 0.69 0.009 9 0.65 0.026 1815−553 14 1.10 0.006 8 0.92 0.003 14 1.17 0.004 8 1.01 0.003 17 0.97 0.008 6 1.05 0.008

1921−293 12 23.9 0.008 11 20.9 0.006 12 19.68 0.006 11 18.06 0.004 9 12.94 0.010 10 13.45 0.008 9 11.28 0.011 8 11.70 0.011 1925−610 8 0.98 0.010 7 0.91 0.006 12 0.96 0.011 7 0.95 0.004 21 0.74 0.015 7 0.76 0.012 21 0.69 0.013 7 0.70 0.011 1937−101 9 0.59 0.012 6 0.60 0.008 8 0.73 0.007 6 0.76 0.005 12 0.86 0.012 7 0.86 0.011 12 0.87 0.008 7 0.80 0.010 1958−179 9 1.17 0.013 6 0.66 0.004 9 1.42 0.010 6 0.72 0.004 8 1.67 0.007 6 0.88 0.006 2016−615 19 0.33 0.008 19 0.005 0.020 12 0.70 0.012

2058−297 8 0.60 0.009 8 0.61 0.005 8 0.70 0.007 8 0.68 0.004 9 0.71 0.005 8 0.66 0.004 9 0.53 0.005 8 0.63 0.016 2106−413 9 2.46 0.007 11 2.29 0.005 9 2.15 0.003 11 2.16 0.005 10 1.80 0.007 7 1.74 0.007 10 1.72 0.013 7 1.64 0.010 2109−811 15 0.60 0.006 15 0.61 0.008 16 0.54 0.007 8 0.46 0.021 2121+053 11 1.03 0.008 5 0.97 0.014 11 1.25 0.010 5 1.14 0.010 9 1.34 0.013 5 1.16 0.007 9 1.33 0.012 5 1.07 0.015 2126−158 9 0.97 0.003 7 0.96 0.005 9 1.19 0.004 7 1.19 0.004 9 0.90 0.010 11 0.92 0.007

2128−123 10 2.55 0.005 8 2.63 0.005 10 2.31 0.007 8 2.27 0.004 9 1.87 0.006 7 1.79 0.007 9 1.57 0.009 7 1.49 0.007 2134+004 7 0.005 0.016 7 8.91 0.004 7 0.006 0.016 7 3.43 0.003 2142−758 13 0.70 0.008 12 0.70 0.007 13 0.87 0.009 12 0.87 0.005 2146−783 17 0.82 0.005 12 0.79 0.003 17 1.10 0.005 12 1.08 0.004 2149−307 12 1.50 0.014 6 1.32 0.006 12 1.71 0.010 6 1.62 0.005 17 1.39 0.016 6 1.41 0.016 17 1.16 0.013 6 1.18 0.018

2155−304 20 0.43 0.024 6 0.49 0.008 21 0.44 0.021 6 0.50 0.005 20 0.41 0.034 9 0.47 0.020 2243−123 14 2.43 0.005 7 2.32 0.003 14 2.35 0.003 7 2.25 0.005 11 1.95 0.016 7 1.90 0.008 11 1.78 0.014 7 1.76 0.012 2245−328 11 0.56 0.008 11 0.010 0.034 2312−319 9 0.44 0.006 8 0.42 0.008 9 0.58 0.007 8 0.56 0.005 12 0.74 0.011 7 0.74 0.009 2320−035 9 0.76 0.010 8 0.76 0.007 9 0.80 0.005 7 0.83 0.010 11 0.81 0.010 9 0.83 0.007 11 0.85 0.009 9 0.84 0.011

2326−477 16 1.67 0.006 8 1.62 0.006 16 1.74 0.007 8 1.71 0.010 13 2.13 0.007 9 2.10 0.009 13 2.56 0.013 8 2.55 0.027 2329−384 10 0.48 0.006 10 0.007 0.021 18 0.64 0.007 2332−017 11 0.55 0.004 7 0.52 0.007 11 0.64 0.009 7 0.62 0.011 2333−528 16 1.30 0.008 9 1.28 0.005 16 1.54 0.004 9 1.55 0.002 12 1.72 0.010 8 1.73 0.008 2345−167 11 2.73 0.009 7 3.06 0.002 11 3.01 0.007 7 3.18 0.005 13 2.44 0.007 7 2.50 0.013 2355−534 14 1.66 0.009 8 1.61 0.006 14 1.76 0.005 8 1.76 0.004

Table 4: The average polarized flux density values (P ) and the polarization variability modulation indices (μ_P ) as well as the average position angle of the polarized flux (ψ_2). The subscripts (1) and (2) correspond to measurements at 8.6, 4.8, 2.4 and 1.4 GHz for May 1994 and August 1994 respectively.

8.6 GHz 4.8 GHz 2.4 GHz 1.4 GHz May 94 August 94 May 94 August 94 May 94 August 94 May 94 August 94 Source N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 name mJy deg mJy deg mJy deg mJy deg mJy deg mJy deg mJy deg mJy deg 0003−066 16 35 0.171 34.1 7 71 0.042 24.5 16 65 0.081 47.5 7 94 0.055 41.8 0044−846 15 18 0.139 9.9 15 28 0.056 6.3 0104−408 17 66 0.098 -6.0 9 82 0.042 2.3 17 90 0.028 19.4 9 69 0.074 21.3 13 27 0.079 -74.7 9 35 0.056 -66.5 0122−003 9 33 0.077 33.3 8 34 0.089 38.3 0146+056 9 91 0.032 -64.2 7 93 0.017 -63.8 9 88 0.033 -66.7 7 78 0.027 -65.1 7 27 0.042 -69.7 7 22 0.065 -72.9

0150−334 17 24 0.080 30.8 10 19 0.104 19.3 17 19 0.107 28.3 10 16 0.138 19.6 12 25 0.074 67.2 9 23 0.248 71.5 0202−172 9 18 0.123 -32.3 10 26 0.080 -42.6 9 81 0.053 -82.7 10 61 0.066 -81.4 11 57 0.028 -45.7 10 51 0.033 -44.7 11 39 0.070 -10.5 10 39 0.212 -13.3 0215+015 10 09 0.346 34.0 9 27 0.575 -35.5 0220−349 13 26 0.089 -76.0 14 18 0.074 -71.8 13 25 0.065 -61.1 14 18 0.110 -55.6 16 16 0.145 -43.3 10 16 0.086 -43.9 0252−549 17 39 0.039 -86.1

0302−623 12 34 0.214 -73.0 12 37 0.048 -68.4 12 45 0.074 -60.1 12 44 0.176 -51.8 18 46 0.083 -28.7 13 39 0.119 -25.2 18 38 0.160 48.3 13 44 0.157 51.6 0308−611 14 21 0.343 1.9 15 25 0.069 -3.6 14 25 0.146 5.2 15 26 0.227 10.6 11 44 0.080 -49.8 12 30 0.144 -52.8 0336−019 7 18 0.240 -37.1 8 22 0.150 -71.1 0346−279 9 30 0.085 19.0 11 19 0.089 19.7 9 39 0.068 29.7 11 24 0.105 26.5 7 28 0.153 41.7 11 28 0.068 44.3 7 27 0.115 -82.6 10 27 0.353 -78.4 0405−385 11 29 0.186 -22.8 76 22 0.071 -26.3 11 47 0.112 -24.5 76 35 0.068 -21.8 14 15 0.553 -12.8 77 22 0.087 -9.4

0420−014 6 68 0.079 -69.1 11 74 0.030 -67.1 6 83 0.045 -75.3 11 76 0.059 -74.1 6 43 0.154 79.3 15 59 0.141 80.6 6 24 0.224 59.0 14 28 0.318 44.6 0426−380 15 21 0.290 -58.1 22 94 0.016 64.6 0440−003 11 29 0.059 40.6 11 54 0.069 65.6 11 18 0.132 -65.0 15 13 0.618 35.7 0450−469 15 21 0.139 18.3 21 19 0.066 23.1 11 30 0.064 32.2 24 26 0.086 35.7 0454−810 16 55 0.110 4.9 17 44 0.138 11.1 16 41 0.139 14.8 17 34 0.154 -2.6 13 17 0.221 31.5 17 39 0.260 42.8

0457+024 7 29 0.126 17.3 12 33 0.070 19.6 0502+049 6 36 0.051 -38.8 9 40 0.052 -38.7 6 56 0.028 -32.7 9 52 0.032 -29.8 10 25 0.160 3.4 8 32 0.289 11.1 0537−441 12 42 0.501 -53.9 35 135 0.034 -82.7 0607−157 10 37 0.246 10.8 11 93 0.078 -10.9 10 17 0.358 -29.4 12 26 0.604 -46.3 8 58 0.091 29.7 11 58 0.075 29.7 8 48 0.106 -33.3 10 57 0.216 -31.6 0642−349 16 23 0.083 24.0 11 21 0.060 25.0 16 14 0.190 -9.5 11 17 0.158 -9.2

0646−306 11 32 0.038 -31.6 16 24 0.103 -33.4 11 48 0.034 -24.7 16 34 0.104 -23.6 13 19 0.067 8.9 11 14 0.149 16.6 0727−115 13 44 0.269 -19.5 12 56 0.077 77.5 13 66 0.100 -64.7 12 25 0.411 30.7 10 50 0.104 77.1 14 69 0.100 -77.6 10 59 0.142 -75.7 13 75 0.113 -71.0 0736+017 9 55 0.037 35.4 13 72 0.018 28.9 9 79 0.028 38.5 13 81 0.018 40.6 8 100 0.034 63.5 10 103 0.025 62.7 8 119 0.049 -83.0 10 129 0.082 -83.8 0808+019 9 19 0.227 -4.9 12 11 0.402 -8.2 13 22 0.247 -11.4 13 10 0.449 11.3 0829+046 11 25 0.112 20.0 11 20 0.103 23.1 11 18 0.061 -11.0 11 14 0.150 -14.8 8 54 0.028 -4.0 12 48 0.056 -1.6 8 47 0.060 25.7 12 43 0.197 32.1

0834−201 10 15 0.261 26.8 12 16 0.085 -18.1 14 20 0.586 59.7 13 14 0.171 62.5 0837+035 9 22 0.057 19.6 11 23 0.050 21.3 9 38 0.038 25.5 11 33 0.064 25.6 8 21 0.104 58.6 10 18 0.110 60.0 1021−006 9 17 0.118 -32.6 7 17 0.045 -31.2 9 19 0.126 -20.1 7 17 0.100 -20.8 1034−293 11 23 0.259 25.2 10 51 0.145 2.8 11 37 0.199 14.5 10 32 0.274 -2.3 1048−313 15 21 0.101 -72.9 10 23 0.054 -73.5 11 20 0.124 -41.1 9 29 0.066 -43.3 11 16 0.167 43.2 9 35 0.142 46.9

1057−797 11 13 0.442 43.0 15 34 0.094 81.6 14 19 0.107 -76.1 19 23 0.155 -61.8 14 8 0.410 61.9 17 25 0.372 55.3 1115−122 11 18 0.113 -16.3 9 12 0.147 -4.7 11 26 0.072 8.5 9 22 0.087 13.3 9 41 0.024 -12.9 9 34 0.086 -16.4

continued on next page continued from previous page_{8.6 GHz 4.8 GHz 2.4 GHz 1.4 GHz}

May 94 August 94 May 94 August 94 May 94 August 94 May 94 August 94 Source N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 N P_1 μ_{P 1} ψ_1 N P_2 μ_{P 2} ψ_2 name mJy deg mJy deg mJy deg mJy deg mJy deg mJy deg mJy deg mJy deg 1127−145 9 91 0.086 -17.7 9 108 10.09 -17.8 9 152 0.056 -20.1 9 132 0.097 -20.0 13 84 0.069 20.9 11 76 0.076 21.5 12 43 0.057 81.7 9 229 0.143 80.3 1144−379 12 50 0.244 32.4 9 86 0.272 47.7 12 75 0.059 33.8 9 62 0.146 60.8 1148−001 9 44 0.046 -52.2 9 47 0.013 -54.5 9 77 0.019 -49.0 9 67 0.049 -5 11 117 0.023 -43.3 8 104 0.026 -43.0 11 143 0.050 -37.4 8 136 0.097 -40.1

1243−072 14 21 0.124 27.2 6 13 0.068 16.1 14 26 0.109 20.6 6 20 0.174 18.9 11 23 0.076 36.5 7 19 0.094 34.6 11 27 0.096 66.4 7 19 0.705 65.1 1255−316 15 46 0.085 -54.5 8 44 0.036 -54.2 15 48 0.051 -58.9 8 41 0.054 -59.7 18 66 0.034 -20.3 11 54 0.168 -20.1 1256−220 16 15 0.146 48.1 7 16 0.084 69.0 11 20 0.121 16.6 7 18 0.047 17.6 11 23 0.110 -30.3 7 28 0.501 -30.9 1334−127 10 119 0.164 78.6 7 163 0.102 -75.4 1351−018 14 18 0.168 -40.2 6 14 0.097 -45.0

1406−076 11 25 0.085 -44.6 7 18 0.078 -63.6 11 18 0.160 -45.2 7 15 0.190 -54.6 1435−218 14 14 0.158 -9.9 8 21 0.079 -12.3 14 23 0.071 -5.0 8 24 0.090 -6.8 1443−162 12 38 0.038 -51.3 7 31 0.041 -50.3 12 36 0.065 -59.2 7 25 0.072 -58.6 1504−166 12 61 0.088 33.8 7 70 0.039 29.3 12 42 0.128 19.7 7 41 0.194 17.1 1519−273 15 45 0.195 -30.2 7 18 0.287 -20.0 15 62 0.319 -24.0 7 26 0.331 -35.2 10 24 0.305 17.5 8 28 0.085 41.4 10 07 0.597 46.2 8 21 0.540 -33.9

1610−771 16 106 0.077 -68.5 13 135 0.015 -67.2 16 122 0.054 -71.7 13 104 0.088 -68.1 1622−297 11 100 0.045 16.4 10 108 0.042 12.8 11 119 0.015 9.9 10 121 0.030 9.0 10 165 0.033 -26.3 9 142 0.020 -25.3 1718−649 14 12 0.240 -10.7 9 17 0.350 -20.1 17 26 0.448 36.2 9 11 0.384 -15.9 18 11 0.221 7.9 9 20 0.684 10.9 1741−038 11 29 0.252 69.0 6 25 0.263 -76.9 11 21 0.168 52.5 6 31 0.131 60.3 13 22 0.146 66.4 6 21 0.075 79.2 13 17 0.275 -73.1 6 16 0.354 -38.9 1815−553 14 42 0.059 81.5 8 18 0.040 80.1 14 40 0.052 -84.1 8 15 0.352 -36.6

1921−293 12 486 0.096 -31.5 11 515 0.056 -67.1 12 567 0.076 17.7 11 249 0.103 82.3 9 604 0.022 18.9 10 295 0.085 22.8 9 359 0.074 -21.9 8 462 0.034 -25.8 1925−610 8 37 0.067 64.2 7 42 0.031 69.6 12 35 0.076 58.7 7 29 0.105 61.2 21 30 0.076 77.6 7 24 0.059 12.4 21 32 0.075 -13.3 7 34 0.193 -7.2 1937−101 8 19 0.116 -22.6 6 18 0.142 -28.5 12 15 0.413 64.3 7 14 0.352 68.1 1958−179 9 26 0.085 84.3 6 21 0.053 79.9 9 39 0.114 69.0 6 28 0.059 78.0 8 44 0.060 32.5 6 36 0.035 43.2 2058−297 8 16 0.111 1.2 8 16 0.101 -85.9 8 20 0.053 43.2 8 18 0.076 83.0 9 19 0.064 -73.1 8 18 0.065 -76.0 9 18 0.076 65.4 8 20 0.384 46.9

2106−413 9 58 0.100 66.8 11 65 0.026 68.0 9 41 0.067 44.8 11 22 0.218 51.6 10 51 0.045 69.6 7 47 0.057 72.9 10 61 0.072 81.4 7 54 0.197 35.0 2121+053 11 36 0.070 59.3 5 17 0.170 76.1 11 45 0.073 63.7 5 25 0.190 58.7 9 35 0.133 65.4 5 31 0.050 51.5 9 42 0.107 68.4 5 25 0.433 55.8 2128−123 10 11 0.572 18.1 8 18 0.123 -12.6 10 21 0.222 -61.9 8 24 0.188 -63.6 9 17 0.131 -44.4 7 14 0.147 -46.4 9 32 0.068 -52.9 7 32 0.229 -5 2134+004 7 100 0.082 -88.2 7 47 0.272 40.5 7 33 0.244 33.9 7 14 0.784 15.4 2142−758 13 15 0.124 73.0 12 20 0.069 72.4 13 16 0.124 70.6 12 18 0.139 78.4

2149−307 12 73 0.025 44.1 6 79 0.030 41.0 12 83 0.049 57.1 6 73 0.019 55.4 17 38 0.077 81.3 6 33 0.079 83.9 17 28 0.166 65.8 6 28 0.242 63.0 2155−304 21 18 0.237 -24.5 6 16 0.085 -26.3 20 17 0.236 -20.6 9 14 0.337 -26.9 2243−123 14 52 0.080 21.1 7 48 0.048 15.9 14 14 0.229 36.6 7 22 0.277 24.8 11 31 0.099 -15.6 7 24 0.180 -17.5 11 36 0.105 -39.1 7 36 0.204 -41.4 2312−319 9 14 0.096 -83.8 8 17 0.056 -82.7 9 24 0.090 -85.1 8 23 0.081 -82.6 12 31 0.077 -74.1 7 28 0.059 -72.3 2326−477 16 47 0.114 -23.3 8 52 0.025 -31.3 16 89 0.032 -3 8 81 0.063 -29.1 13 128 0.017 -19.1 9 111 0.039 -19.2 13 137 0.040 -61.8 8 126 0.108 1.0

2329−384 10 25 0.077 71.7 10 28 0.051 87.5 2332−017 11 21 0.167 -24.9 7 17 0.103 -22.4 11 32 0.084 -33.5 7 23 0.060 -31.9 2345−167 11 60 0.117 16.2 7 48 0.031 3.3 11 55 0.132 9.7 7 43 0.204 13.7 13 49 0.165 -1.0 7 46 94 9.4 2355−534 14 31 0.154 -4.2 8 25 0.073 -15.4 14 48 0.126 -10.6 8 49 0.107 -13.4

Table 5: Spectral indices for two observing sessions in May 1994 and August 1994, calculated from the flux densities averaged over duration of each session.

PKS May 1994 August 1994 Source α^{8.6}_{4.8} α^{4.8}_{2.4} α^{2.4}_{1.4} α^{8.6}_{1.4} α^{8.6}_{4.8} α^{4.8}_{2.4} α^{2.4}_{1.4} α^{8.6}_{1.4} name 0003−066 -0.06 0.24 0.34 0.17 -0.13 0.24 0.43 0.18 0013−005 -0.33 -0.14 0.09 -0.13 -0.41 -0.10 0.12 -0.14 0023−263 -0.93 -0.74 -0.66 -0.78 -0.99 -0.73 -0.68 -0.80 0044−846 -0.27 -0.10 -0.15 -0.17 0048−427 0.24 0.36 0.33 0.31 0.14 0.41 0.39 0.32

0056−572 -0.20 0.01 0.10 -0.03 -0.23 -0.01 0.09 -0.05 0104−408 0.88 0.76 0.46 0.71 0.89 0.94 0.30 0.73 0122−003 -0.09 0.05 0.02 0.00 -0.08 0.03 0.10 0.01 0131−522 0.24 0.12 -0.39 0.01 0138−097 -0.08 0.16 0.09 0.06 -0.03 0.16 0.25 0.12

0142−278 -0.09 0.09 -0.17 -0.04 -0.29 0.02 -0.06 -0.10 0146+056 -0.09 0.30 0.50 0.24 -0.11 0.30 0.50 0.23 0150−334 -0.28 -0.08 -0.03 -0.13 -0.36 -0.12 -0.05 -0.18 0202−172 0.02 0.21 0.08 0.11 -0.07 0.22 0.10 0.09 0208−512 0.03 -0.09 -0.07 -0.04

0214−522 -0.70 -0.48 -0.36 -0.52 -0.74 -0.49 -0.36 -0.53 0215+015 0.40 0.04 -0.16 0.09 0.35 0.28 0.10 0.25 0220−349 -0.07 0.17 0.12 0.08 -0.09 0.21 0.20 0.12 0252−549 0.06 0.09 -0.02 0.05 0302−623 -0.17 -0.03 -0.03 -0.07 -0.19 0.00 0.13 -0.02

0308−611 0.34 0.46 0.18 0.34 0.28 0.46 0.23 0.33 0334−546 -0.50 0.07 0.50 0.01 -0.53 0.05 0.48 0.00 0336−019 -0.04 0.11 0.21 0.09 -0.16 0.07 0.10 0.01 0346−279 0.05 0.21 0.17 0.14 0.11 0.17 0.18 0.15 0355−483 -0.43 0.17 0.22 -0.01

0405−385 0.08 0.29 0.38 0.25 0.08 0.24 0.33 0.22 0420−014 -0.13 0.04 0.30 0.07 -0.13 -0.14 -0.13 -0.13 0422+004 0.18 0.19 -0.05 0.11 0426−380 0.37 0.56 0.37 0.44 0.14 0.42 0.46 0.34 0434−188 -0.15 0.25 0.61 0.23 -0.15 0.29 0.64 0.26

0437−454 -0.06 -0.05 -0.13 -0.08 0.09 0.00 0.12 0.07 0440−003 -0.19 0.02 0.20 0.01 0450−469 -0.31 -0.16 -0.16 -0.21 -0.23 -0.02 0.01 -0.08 0454−463 -0.28 -0.26 -0.50 -0.34 0454−810 0.15 0.15 0.35 0.21 0.21 0.39 0.30 0.31

0457+024 -0.50 -0.19 0.06 -0.22 -0.55 -0.18 0.07 -0.22 0502+049 -0.40 -0.22 0.09 -0.19 -0.12 -0.21 0.08 -0.09 0522−611 -0.02 -0.02 -0.17 -0.06 -0.12 -0.08 -0.17 -0.12 0528−250 -0.52 -0.43 0.05 -0.32 -0.54 -0.38 0.14 -0.28 0537−286 -0.67 -0.42 -0.09 -0.40 -0.59 -0.42 0.02 -0.35

0537−441 0.32 0.47 0.31 0.37 0.34 0.28 0.51 0.37 0607−157 0.39 0.41 -0.03 0.27 0.55 0.56 0.13 0.43 0642−349 -0.30 0.20 0.20 0.04 -0.33 0.18 0.23 0.03 0646−306 -0.03 0.42 0.14 0.19 -0.10 0.20 0.33 0.14 0648−165 0.06 0.02 -0.21 -0.04 0.13 0.03 -0.28 -0.03

0727−115 -0.08 0.36 0.36 0.22 -0.06 0.23 0.44 0.20 0728−320 -0.54 -0.20 0.12 -0.21 -0.70 -0.44 0.26 -0.31 0733−174 -0.62 -0.46 -0.11 -0.40 -0.60 -0.42 -0.18 -0.41 0736+017 -0.12 -0.11 -0.24 -0.15 -0.30 -0.43 -0.37 -0.37 0808+019 0.09 0.28 0.17 0.19 -0.06 0.08 0.00 0.01

0829+046 0.09 0.17 0.05 0.11 0.20 0.16 0.09 0.15 0834−201 0.34 0.17 -0.28 0.09 0.33 0.11 -0.22 0.08 0837+035 -0.16 0.08 0.16 0.03 -0.14 0.04 0.14 0.01 1021−006 -0.68 -0.39 0.04 -0.35 -0.67 -0.44 0.03 -0.37 1034−293 0.73 0.82 -0.07 0.52 0.45 0.29 0.42 0.38

1036−154 0.10 0.03 -0.10 0.01 0.08 0.00 -0.03 0.02 1048−313 -0.30 -0.06 0.12 -0.08 -0.30 -0.15 0.04 -0.14 1057−797 0.01 0.48 0.71 0.40 0.05 0.60 0.45 0.38 1105−680 -0.24 0.39 0.93 0.35 -0.33 0.28 0.91 0.27 1115−122 0.08 0.08 -0.17 0.00 0.03 -0.07 -0.15 -0.06

continued on next page continued from previous page

PKS May 1994 August 1994 Source α^{8.6}_{4.8} α^{4.8}_{2.4} α^{2.4}_{1.4} α^{8.6}_{1.4} α^{8.6}_{4.8} α^{4.8}_{2.4} α^{2.4}_{1.4} α^{8.6}_{1.4} name

1127−145 -0.39 -0.30 -0.26 -0.31 -0.41 -0.33 -0.26 -0.33 1143−245 -0.56 -0.23 0.20 -0.21 -0.53 -0.24 0.28 -0.18 1144−379 -0.10 0.22 -0.20 -0.01 0.09 0.11 0.36 0.18 1148−001 -0.56 -0.41 -0.37 -0.45 -0.56 -0.47 -0.34 -0.46 1148−671 -0.65 -0.15 0.68 -0.06 -0.68 -0.10 0.86 0.00

1243−072 0.37 0.46 0.27 0.38 0.36 0.38 0.33 0.36 1253−055 0.32 0.29 0.15 0.26 0.29 0.26 0.41 0.31 1255−316 -0.09 0.29 0.23 0.15 -0.10 0.38 0.37 0.22 1256−220 0.25 -0.11 -0.22 -0.03 0.49 -0.04 -0.26 0.06 1334−127 0.29 0.56 0.44 0.44 0.33 0.35 0.52 0.39

1351−018 -0.24 0.25 0.34 0.12 -0.22 0.20 0.37 0.12 1354−152 -0.16 0.34 0.35 0.18 -0.05 0.20 0.39 0.18 1402−012 -0.61 -0.36 -0.26 -0.41 -0.59 -0.38 -0.19 -0.39 1406−076 0.49 0.50 0.00 0.34 0.37 0.45 0.09 0.32 1435−218 -0.17 -0.15 -0.12 -0.15 -0.07 -0.14 -0.01 -0.08

1443−162 0.04 0.12 -0.20 0.00 -0.03 0.06 -0.10 -0.02 1502+036 0.07 0.10 0.22 0.13 0.12 0.64 0.48 0.42 1504−166 -0.11 -0.02 -0.05 -0.06 -0.10 0.02 -0.04 -0.04 1519−273 -0.03 0.40 0.20 0.20 0.04 0.43 0.62 0.36 1535+004 -0.46 -0.20 -0.10 -0.25 -0.45 -0.21 -0.03 -0.23

1540−828 -0.25 -0.14 -0.34 -0.23 -0.29 -0.11 -0.27 -0.21 1549−790 -0.63 -0.21 -0.14 -0.33 1555−140 -0.60 -0.14 0.81 0.00 -0.61 -0.18 0.85 -0.01 1556−245 -0.59 -0.53 -0.47 -0.53 -0.54 -0.47 1.42 0.07 1610−771 -0.01 -0.02 -0.21 -0.07 0.01 0.01 -0.12 -0.03

1619−680 -0.53 -0.08 0.38 -0.09 -0.56 -0.01 0.36 -0.08 1622−297 -0.05 0.12 0.06 0.05 -0.04 0.10 -0.18 -0.03 1718−649 -0.35 0.09 0.32 0.02 -0.40 0.08 0.34 0.00 1741−038 0.41 0.42 0.35 0.40 0.56 0.49 0.51 0.52 1758−651 0.10 0.11 -0.24 0.00 0.10 0.13 -0.22 0.01

1815−553 -0.10 0.27 0.32 0.16 -0.15 -0.06 0.01 -0.06 1921−293 0.33 0.60 0.25 0.41 0.25 0.42 0.25 0.32 1925−610 0.03 0.37 0.11 0.19 -0.08 0.31 0.15 0.14 1937−101 -0.37 -0.23 -0.01 -0.21 -0.40 -0.16 0.12 -0.15 1958−179 -0.34 -0.23 -0.12 -0.23 -0.16 -0.29 -0.32 -0.26

2016−615 -0.69 -0.51 -0.49 -0.56 2052−474 -0.23 -0.10 -0.17 -0.16 -0.31 -0.12 0.08 -0.12 2058−297 -0.25 -0.03 0.54 0.07 -0.20 0.04 0.10 -0.02 2106−413 0.23 0.25 0.09 0.20 0.10 0.31 0.11 0.18 2109−811 -0.03 0.18 0.27 0.14

2121+053 -0.33 -0.10 0.01 -0.14 -0.27 -0.02 0.14 -0.05 2126−158 -0.35 0.40 0.89 0.31 -0.36 0.38 0.86 0.28 2128−123 0.17 0.30 0.32 0.27 0.25 0.34 0.33 0.31 2134+004 -0.23 0.42 1.20 0.45 2142−758 -0.36 -0.27 -0.27 -0.30 -0.37 -0.25 -0.21 -0.28

2146−783 -0.51 0.23 0.68 0.13 -0.53 0.21 0.61 0.09 2149−307 -0.22 0.29 0.33 0.14 -0.34 0.20 0.33 0.06 2155−304 -0.03 0.10 0.07 0.05 -0.04 0.08 -0.03 0.01 2243−123 0.05 0.26 0.17 0.17 0.05 0.24 0.14 0.15 2245−328 0.07 -0.16 -0.41 -0.16

2312−319 -0.46 -0.35 -0.28 -0.36 -0.50 -0.38 -0.24 -0.38 2320−035 -0.09 -0.02 -0.09 -0.06 -0.16 0.01 -0.02 -0.05 2326−477 -0.07 -0.29 -0.40 -0.25 -0.09 -0.29 -0.36 -0.25 2329−384 -0.48 -0.01 0.32 -0.06 2332−017 -0.25 -0.11 -0.02 -0.13 -0.30 -0.13 0.07 -0.12

2333−528 -0.29 -0.16 -0.19 -0.21 -0.33 -0.16 0.05 0.18 2345−167 -0.16 0.29 0.01 0.06 -0.07 0.20 0.18 0.11 2355−534 -0.25 0.18 0.04 0.00 -0.14 0.04 0.06 -0.01

Table 6: The list of sources which show modulation indices exceeding 3σ for any of the frequencies, 2.4, 4.8 and 8.6 GHz, in any of the two observing sessions: May (μ_M ) and August 1994 (μ_A). Entrees in bold are those specifically > 3σ.

Source 8.6 GHz 4.8 GHz 2.4 GHz 14.GHz name μ_M μ_A μ_M μ_A μ_M μ_A μ_M μ_A 0104−408 0.011 0.003 0.013 0.004 0.044 0.007 0346−279 0.009 0.007 0.030 0.015 0.016 0.022 0.027 0.030 0405−385 0.043 0.003 0.056 0.007 0.056 0.011 0.052 0.009 0422+004 0.018 0.024 0437−454 0.025 0.009 0.016 0.014 0440−003 0.029 0.011 0.018 0.015 0450−469 0.012 0.003 0.016 0.004 0.034 0.006 0502+049 0.005 0.027 0.018 0.011 0.024 0.021 0528−250 0.020 0.009 0.014 0.005 0607−157 0.012 0.005 0.013 0.023 0.013 0.031 0.009 0.008 0646−306 0.014 0.012 0.024 0.011 0.037 0.024 0.021 0.032 0728−320 0.026 0.011 0.034 0.007 0808+019 0.014 0.021 0.011 0.023 0.025 0.022 1034−293 0.057 0.012 0.092 0.113 1048−313 0.026 0.019 0.011 0.025 0.023 0.010 0.030 0.015 1144−379 0.075 0.017 0.146 0.031 1256−220 0.012 0.027 0.014 0.022 0.009 0.007 0.040 0.017 1502+036 0.020 0.002 0.014 0.008 1519−273 0.029 0.018 0.037 0.023 0.040 0.009 0.035 0.009 1556−245 0.015 0.042 0.028 0.033 1622−297 0.020 0.031 0.011 0.014 0.021 0.016 2155−304 0.024 0.008 0.021 0.005 0.034 0.020

Table 7: The list of sources which have their day-to-day polarized flux densities differences larger than 3σ in any of the two observing sessions: May (ΔP_M ) and August 1994 (ΔP_A). These sources did not show IDV of the total flux density at the same time as the polarized flux density IDV.

Source 8.6 GHz 4.8 GHz 2.4 GHz 1.4 GHz name ΔP_M ΔP_A ΔP_M ΔP_A ΔP_M ΔP_A ΔP_M ΔP_A 0150−334 -0.006 -0.009 -0.002 0.005 -0.003 -0.004 -0.007 -0.012 0346−279 0.125 0.009 0.036 0.000 0.051 -0.014 0.016 -0.041 0607−157 -0.010 -0.007 0.013 0.033 0.012 -0.002 -0.001 -0.002 0727−115 0.009 -0.006 0.011 -0.002 1334−127 0.000 0.010 0.001 0.001 1504−166 0.002 0.003 -0.001 0.007 0.010 0.011 0.010 -0.006 1622−297 0.003 0.072 -0.085 -0.110 2106−413 0.004 0.020 0.001 0.000 -0.002 -0.001 0.001 0.007 2149−307 -0.001 0.003 0.015 -0.007 2155−304 0.024 -0.005 0.010 -0.029 2312−319 -0.011 0.009 0.016 -0.017