VLBI Telescope locations

Telescope Longitude Latitude Elevation East (^∘) geodetic (^∘) (m) Narrabri 149.57 -30.31 217 Mopra 149.07 -31.30 840 Parkes 148.26 -33.00 392 Tidbinbilla(DSS43)^1 148.98 -35.40 670 Hobart 147.44 -42.80 100 Ceduna 133.81 -31.87 160 Perth^2 115.89 -31.80 55 Hartebeesthoek 27.67 -25.89 1391

1 DSS45 is ∼200m from DSS43.

2 Perth is no longer available for VLBI. Is retained here to give the WA baselines.

VLBI Baselines (km)

Narr. Mopra Parkes Tidb. Hobart Ceduna Perth Hart. Narrabri . . . 113 321 566 1396 1504 3168 9853 Mopra 113 . . . 207 459 1287 1449 3111 9791 Parkes 321 207 . . . 275 1089 1361 3009 9673 Tidbinbilla 566 459 275 . . . 832 1456 3053 9595 Hobart 1396 1287 1089 832 . . . 1702 3001 9175 Ceduna 1504 1449 1361 1456 1702 . . . 1689 8955 Perth 3168 3111 3009 3053 3001 1689 . . . 7810 Hartebeesthoek 9853 9791 9673 9595 9175 8955 7810 . . .

December 2004

Table 2: VLBI telescopes – Locations and Baselines.