IF 1-1 CH 9- 25 STK RR CC ver 0

Ampltude vs Time for VT138_1100.UV.1

PLot file version 3 created 07-JUN-1997 17:13:17

2.0 1.5 1.0 0.5 0.0

TD7-CAS

Janskys

2.5 2.0 1.5 1.0 0.5 0.0

TD7-HOB

TIME (HOURS)

11 00 30 12 00 30 13 00 30 14 00

1.2 1.0 0.8 0.6 0.4 0.2 0.0

CAS-HOB